From 53cf63fbbc3a8b0d41feb7b81c1ef0da652f616b Mon Sep 17 00:00:00 2001
From: Andree Buschmann <AndreeBuschmann@t-online.de>
Date: Wed, 14 Apr 2010 19:44:07 +0000
Subject: Consistent use of Hz, kHz, dB, dbFS, ms, s and min. Add spaces
 between number and unit -- e.g. '5 dB'.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@25648 a1c6a512-1295-4272-9138-f99709370657
---
 manual/appendix/config_file_options.tex | 28 ++++++++++++++--------------
 1 file changed, 14 insertions(+), 14 deletions(-)

(limited to 'manual/appendix/config_file_options.tex')

diff --git a/manual/appendix/config_file_options.tex b/manual/appendix/config_file_options.tex
index aa3cd16..17e9cb7 100644
--- a/manual/appendix/config_file_options.tex
+++ b/manual/appendix/config_file_options.tex
@@ -158,7 +158,7 @@
       replaygain noclip
                     & on, off           & N/A\\
       replaygain preamp
-                    & -120 to 120       & 0.1dB\\
+                    & -120 to 120       & 0.1 dB\\
 %
       \opt{crossfade}{
       crossfade     & off, auto track change, man track skip, shuffle,
@@ -178,16 +178,16 @@
 %
       crossfeed     & on, off           & N/A\\
       crossfeed direct gain
-                    & 0 to 60           & 0.1dB\\
+                    & 0 to 60           & 0.1 dB\\
       crossfeed cross gain
-                    & 30 to 120         & 0.1dB\\
+                    & 30 to 120         & 0.1 dB\\
       crossfeed hf attenuation
-                    & 60 to 240         & 0.1dB\\
+                    & 60 to 240         & 0.1 dB\\
       crossfeed hf cutoff
                     & 500 to 2000       & Hz\\
 %
       eq enabled    & on, off           & N/A\\
-      eq precut     & 0 to 240          & 0.1dB\\
+      eq precut     & 0 to 240          & 0.1 dB\\
       eq band 0 cutoff & 0 to 32768     & Hz\\
       eq band 1 cutoff & 0 to 32768     & Hz\\
       eq band 2 cutoff & 0 to 32768     & Hz\\
@@ -198,11 +198,11 @@
       eq band 2 q   & 0 to 64           & N/A\\
       eq band 3 q   & 0 to 64           & N/A\\
       eq band 4 q   & 0 to 64           & N/A\\
-      eq band 0 gain & -240 to 240      & 0.1dB\\
-      eq band 1 gain & -240 to 240      & 0.1dB\\
-      eq band 2 gain & -240 to 240      & 0.1dB\\
-      eq band 3 gain & -240 to 240      & 0.1dB\\
-      eq band 4 gain & -240 to 240      & 0.1dB\\
+      eq band 0 gain & -240 to 240      & 0.1 dB\\
+      eq band 1 gain & -240 to 240      & 0.1 dB\\
+      eq band 2 gain & -240 to 240      & 0.1 dB\\
+      eq band 3 gain & -240 to 240      & 0.1 dB\\
+      eq band 4 gain & -240 to 240      & 0.1 dB\\
 %
       dithering enabled & on, off       & N/A\\
 %
@@ -226,7 +226,7 @@
     \opt{masf}{
       loudness      & 0 to 17           & N/A\\
       superbass     & on, off           & N/A\\
-      auto volume   & off, 20ms, 2s, 4s, 8s
+      auto volume   & off, 20 ms, 2 s, 4 s, 8 s
                                         & seconds\\
       mdb enable    & on,off            & N/A\\
       mdb strength  & 0 to 127          & dB\\
@@ -238,10 +238,10 @@
     \opt{lcd_bitmap}{
       peak meter release
                     & 1 to 126          & ?\\
-      peak meter hold
+       peak meter hold
                     & off, 200ms, 300ms, 500ms, 1, 2, 3, 4, 5, 6, 7, 8, 9, 10,
                       15, 20, 30, 1min  & N/A \\
-      peak meter clip hold
+       peak meter clip hold
                     & on, 1, 2, 3, 4, 5, 6, 7, 8, 9, 10, 15, 20, 25, 30, 45,
                       60, 90, 2min, 3min, 5min, 10min, 20min, 45min, 90min
                                         & N/A \\
@@ -357,7 +357,7 @@
       jump scroll
                 & 0 to 5                & N/A\\
       jump scroll delay
-                & 0 to 250              & 0.01s\\
+                & 0 to 250              & 0.01 s\\
     }%
 
     \bottomrule
-- 
cgit v1.1

