From a3e191e9747a3065ebbbee4f5a963416cafb7f55 Mon Sep 17 00:00:00 2001
From: Sebastian Leonhardt <sebastian.leonhardt@web.de>
Date: Thu, 27 Jul 2017 00:22:18 +0200
Subject: Manual (iRiver H300): Update list of supported FW versions (FS#13109)

Change-Id: Ifce260fa784cb3171f961a59d05a2f40bb49d3fd
---
 manual/getting_started/installation.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/installation.tex')

diff --git a/manual/getting_started/installation.tex b/manual/getting_started/installation.tex
index da138e2..64364fc 100644
--- a/manual/getting_started/installation.tex
+++ b/manual/getting_started/installation.tex
@@ -344,7 +344,7 @@ filesystem.\\*
     Likewise, the iHP110 and iHP115 use the same firmware, called 
     \fname{ihp\_100.hex}. Be sure to use the correct firmware file for 
     your player.}
-    \opt{iriverh300}{1.28K, 1.28EU, 1.28J, 1.29K, 1.29J and 1.30EU.
+    \opt{iriverh300}{1.28K, 1.28EU, 1.28J, 1.29K, 1.29J, 1.30EU and 1.31K.
     \note{The US \playername{} firmware is not supported and cannot be
     patched to be used with the bootloader. If you wish to install Rockbox
     on a US \playername{}, you must first install a non-US version of the
-- 
cgit v1.1

