From 37d26dead9c9172a9e4e785c1906f2ac25c767ef Mon Sep 17 00:00:00 2001
From: Martin Arver <martin.arver@gmail.com>
Date: Mon, 6 Mar 2006 20:47:25 +0000
Subject: Added screenshots to a number of plugins for the 160x128x2
 screensizes. Now most of the 2.4 plugins have screenshots for this resolution

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@8936 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/battery_test.tex | 5 ++---
 1 file changed, 2 insertions(+), 3 deletions(-)

(limited to 'manual/plugins/battery_test.tex')

diff --git a/manual/plugins/battery_test.tex b/manual/plugins/battery_test.tex
index 65f48e2..6d798f4 100644
--- a/manual/plugins/battery_test.tex
+++ b/manual/plugins/battery_test.tex
@@ -1,7 +1,7 @@
 \subsection{Battery\_test}
-\begin{figure}[h]
+\begin{figure}[h!]
 \begin{center}
-%\includegraphics{plugins/images/\platform/ss_battery_test.png}
+\includegraphics[width=4cm]{plugins/images/ss-battery_test-\genericimg.png}
 \end{center}
 \caption{Battery Test}
 \end{figure}
@@ -13,4 +13,3 @@ log file. The test stops when battery level reaches 4\% in order to
 avoid being unable to write to the disk.  The power usage data is saved
 to a file in the root directory of the Jukebox.  This plugin can
 sometimes be useful for diagnosing problems with battery charging.
-
-- 
cgit v1.1

