From 0d2a3598f742bd9fe79e72b39eddfc977fc90e30 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Nils=20Wallm=C3=A9nius?= <nils@rockbox.org>
Date: Sat, 17 Jun 2006 19:09:57 +0000
Subject: Add screenshots to clock section x5 screenshot still missing

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@10134 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/clock.tex | 7 +------
 1 file changed, 1 insertion(+), 6 deletions(-)

(limited to 'manual/plugins/clock.tex')

diff --git a/manual/plugins/clock.tex b/manual/plugins/clock.tex
index 0c7795d..8b022f0 100644
--- a/manual/plugins/clock.tex
+++ b/manual/plugins/clock.tex
@@ -1,10 +1,5 @@
 \subsection{Clock}
-{\centering\itshape
-  [Warning: Image ignored] % Unhandled or unsupported graphics:
-%\includegraphics[width=3.528cm,height=2.016cm]{images/rockbox-manual-img63.png}
- \newline
-Clock
-\par}
+\screenshot{plugins/images/ss-clock}{Clock}{img:clock}
 
 This is a fully featured analogue and digital clock plugin.  
 
-- 
cgit v1.1

