From 1925cd1cfbbfd88087e5f003dbfb2167a49c749b Mon Sep 17 00:00:00 2001
From: Alex Parker <rockbox@aeparker.com>
Date: Sun, 22 Nov 2009 11:36:07 +0000
Subject: A few more spelling corrections.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@23694 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/doom.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/plugins/doom.tex')

diff --git a/manual/plugins/doom.tex b/manual/plugins/doom.tex
index 687e140..b3c4086 100644
--- a/manual/plugins/doom.tex
+++ b/manual/plugins/doom.tex
@@ -49,7 +49,7 @@ Rockdoom options, you will need to quit your current game and restart the plugin
   \emph{Fake Contrast.} Enable or Disable modified game lighting\\
   \emph{Always Run.} Make the player always run\\
   \emph{Headsup Display.} Show the player status when in fullscreen\\
-  \emph{Statusbar Always Red.} Disable color response statusbar%\\
+  \emph{Statusbar Always Red.} Disable colour response statusbar%\\
 
   \item[InGame Main Menu. ]This menu can only be accessed from within a running game, and is displayed by
     \opt{IRIVER_H100_PAD,IRIVER_H300_PAD}{pressing \ButtonOff}%
-- 
cgit v1.1

