From 1248e9c6de7687ee7bb76e43dcebac2e0575ecc7 Mon Sep 17 00:00:00 2001
From: Andree Buschmann <AndreeBuschmann@t-online.de>
Date: Wed, 14 Apr 2010 20:38:21 +0000
Subject: More work on consistent usage of units in the manual. Use
 non-breaking spaces if applicable.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@25649 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/mpegplayer.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/plugins/mpegplayer.tex')

diff --git a/manual/plugins/mpegplayer.tex b/manual/plugins/mpegplayer.tex
index 5e92df5..e5d4cc9 100644
--- a/manual/plugins/mpegplayer.tex
+++ b/manual/plugins/mpegplayer.tex
@@ -81,7 +81,7 @@ Display Options Menu
     video is full-screen this means it will get overwritten by the video and
     appear to flash once per second) the average number of frames decoded per
     second, the total number of frames skipped (see the Skip Frames option),
-    the current time (in 100 Hz ticks) and the time the current frame is due to
+    the current time (in 100~Hz ticks) and the time the current frame is due to
     be displayed.
 \item[Limit FPS] (default: on) With this option disabled, mpegplayer will
     display the video as fast as it can. Useful for benchmarking.
-- 
cgit v1.1

