From 5c09844d54c7adba80fd261e83a4c895d007a576 Mon Sep 17 00:00:00 2001
From: Teruaki Kawashima <teru@rockbox.org>
Date: Sun, 16 Jan 2011 11:40:47 +0000
Subject: Update manual for image viewer plugin.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@29065 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/ppmviewer.tex | 9 ---------
 1 file changed, 9 deletions(-)
 delete mode 100644 manual/plugins/ppmviewer.tex

(limited to 'manual/plugins/ppmviewer.tex')

diff --git a/manual/plugins/ppmviewer.tex b/manual/plugins/ppmviewer.tex
deleted file mode 100644
index 11a8dfc..0000000
--- a/manual/plugins/ppmviewer.tex
+++ /dev/null
@@ -1,9 +0,0 @@
-% $Id$ %
-\subsection{PPM viewer}
-This plugin opens \fname{.ppm} files from the \setting{File Browser}
-to display them. Exit the ppm viewer plugin by pressing any button.
-
-\note{Both ASCII PPM (P3) and raw PPM (P6) files are supported.}
-
-For more information about PPM files, see
-\url{http://netpbm.sourceforge.net/doc/ppm.html}
-- 
cgit v1.1

