From 1248e9c6de7687ee7bb76e43dcebac2e0575ecc7 Mon Sep 17 00:00:00 2001
From: Andree Buschmann <AndreeBuschmann@t-online.de>
Date: Wed, 14 Apr 2010 20:38:21 +0000
Subject: More work on consistent usage of units in the manual. Use
 non-breaking spaces if applicable.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@25649 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/split_editor.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/plugins/split_editor.tex')

diff --git a/manual/plugins/split_editor.tex b/manual/plugins/split_editor.tex
index a38a49d..dad5ca0 100644
--- a/manual/plugins/split_editor.tex
+++ b/manual/plugins/split_editor.tex
@@ -179,7 +179,7 @@ The values in the waveform are scaled according to the settings of the
 peak meter. These can be altered in the peak meter settings,
 see \reference{ref:Peakmetersetting}. If extreme minimum or
 maximum values are set the waveform might be cut off.  A minimum
-setting of {}-60 dB and a maximum setting of 0 dB are recommended.
+setting of {}-60~dB and a maximum setting of 0~dB are recommended.
 These settings should be capable of producing useful waveforms for very
 soft sounds in logarithmic mode (dB). When the editor is used on loud
 sounds (such as commercial rock or pop music) switching to the linear
-- 
cgit v1.1

