From 5035833bf8a6c31af1d4d5af17d9eb0edcb07973 Mon Sep 17 00:00:00 2001
From: Szymon Dziok <b0hoon@o2.pl>
Date: Fri, 23 Apr 2010 19:39:39 +0000
Subject: Packard Bell Vibe: finish the manual.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@25703 a1c6a512-1295-4272-9138-f99709370657
---
 manual/plugins/stats.tex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'manual/plugins/stats.tex')

diff --git a/manual/plugins/stats.tex b/manual/plugins/stats.tex
index c855fb5..ebbe388 100644
--- a/manual/plugins/stats.tex
+++ b/manual/plugins/stats.tex
@@ -11,6 +11,7 @@ Press %
 \opt{IAUDIO_X5_PAD,IRIVER_H10_PAD,SANSA_E200_PAD,SANSA_C200_PAD,GIGABEAT_PAD%
     ,MROBE100_PAD,COWON_D2_PAD}{\ButtonPower}%
 \opt{SANSA_FUZE_PAD}{\ButtonHome}%
+\opt{PBELL_VIBE500_PAD}{\ButtonRec}%
 \opt{GIGABEAT_S_PAD}{\ButtonBack} %
 to abort counting and exit the plugin. Press it again to quit after counting
 has finished.
-- 
cgit v1.1

