From 53cf63fbbc3a8b0d41feb7b81c1ef0da652f616b Mon Sep 17 00:00:00 2001
From: Andree Buschmann <AndreeBuschmann@t-online.de>
Date: Wed, 14 Apr 2010 19:44:07 +0000
Subject: Consistent use of Hz, kHz, dB, dbFS, ms, s and min. Add spaces
 between number and unit -- e.g. '5 dB'.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@25648 a1c6a512-1295-4272-9138-f99709370657
---
 manual/rockbox_interface/wps.tex | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'manual/rockbox_interface/wps.tex')

diff --git a/manual/rockbox_interface/wps.tex b/manual/rockbox_interface/wps.tex
index 5930193..0466e6e 100644
--- a/manual/rockbox_interface/wps.tex
+++ b/manual/rockbox_interface/wps.tex
@@ -202,9 +202,9 @@ your WPS (While Playing Screen).
   \item [The scale:]
     Between the indicators of the right and left channel there are little dots.
     These dots represent important volume values. In linear mode each dot is a
-    10\% mark. In dbfs mode the dots represent the following values (from right
-    to left): 0db, {}-3db, {}-6db, {}-9db, {}-12db, {}-18db, {}-24db, {}-30db,
-    {}-40db, {}-50db, {}-60db.
+    10\% mark. In dBFS mode the dots represent the following values (from right
+    to left): 0 dB, {}-3 dB, {}-6 dB, {}-9 dB, {}-12 dB, {}-18 dB, {}-24 dB, {}-30 dB,
+    {}-40 dB, {}-50 dB, {}-60 dB.
   \end{description}
 }
 \subsection{\label{sec:contextmenu}The WPS Context Menu}
-- 
cgit v1.1

