\subsection{Firmware\_flash}
{\centering\mdseries\itshape
  [Warning: Image ignored] % Unhandled or unsupported graphics:
%\includegraphics[width=3.634cm,height=2.076cm]{images/rockbox-manual-img66.png}
 \newline
Firmware\_flash
\par}

Use when flashing Rockbox (see page \pageref{ref:FlashingRockboxReal}.
In the ideal case, you'll need this tool only once. For safety reasons you may wish to delete \textbf{firmware\_flash.rock} from \textbf{/.rockbox/rocks} once flashing is complete.


